--- trunk/electrostaticMethodsPaper/electrostaticMethods.tex	2006/03/14 14:17:07	2615
+++ trunk/electrostaticMethodsPaper/electrostaticMethods.tex	2006/03/14 14:31:19	2616
@@ -322,7 +322,7 @@ In the previous studies using a Shifted-Force variant 
 \begin{figure}
 \centering
 \includegraphics[width = 3.25in]{./spectraSquare.pdf}
-\caption{Power spectra obtained from the velocity auto-correlation functions of NaCl crystals at 1000 K while using SPME, Shifted-Force ($\alpha$ = 0, 0.1, \& 0.2), and Shifted-Potential ($\alpha$ = 0.2).  Apodization of the correlation functions via a cubic switching function between 40 and 50 ps was used to clear up the spectral noise resulting from data truncation, and had no noticeable effect on peak location or magnitude.  The inset shows the frequency region below 100 cm$^{-1}$ to highlight where the spectra begin to differentiate.}
+\caption{Power spectra obtained from the velocity auto-correlation functions of NaCl crystals at 1000 K while using SPME, Shifted-Force ($\alpha$ = 0, 0.1, \& 0.2), and Shifted-Potential ($\alpha$ = 0.2).  Apodization of the correlation functions via a cubic switching function between 40 and 50 ps was used to clear up the spectral noise resulting from data truncation, and had no noticeable effect on peak location or magnitude.  The inset shows the frequency region below 100 cm$^{-1}$ to highlight where the spectra begin to differ.}
 \label{fig:methodPS}
 \end{figure}
 
