--- trunk/langevinHull/langevinHull.tex	2010/10/19 18:25:01	3655
+++ trunk/langevinHull/langevinHull.tex	2010/10/20 18:44:00	3659
@@ -379,7 +379,7 @@ Both NVT \cite{Glattli2002} and NPT \cite{Motakabbir19
 Both NVT \cite{Glattli2002} and NPT \cite{Motakabbir1990, Pi2009} molecular dynamics simulations of SPC/E water have yielded values for the isothermal compressibility of water that agree well with experiment \cite{Fine1973}. The results of three different methods for computing the isothermal compressibility from Langevin Hull simulations for pressures between 1 and 6500 atm are shown in Fig. 5 along with compressibility values obtained from both other SPC/E simulations and experiment. Compressibility values from all references are for applied pressures within the range 1 - 1000 atm. 
 
 \begin{figure}
-\includegraphics[width=\linewidth]{new_isothermal}
+\includegraphics[width=\linewidth]{new_isothermalN}
 \caption{Compressibility of SPC/E water}
 \label{compWater}
 \end{figure}
