--- trunk/nanoglass/experimental.tex	2007/09/19 16:53:58	3226
+++ trunk/nanoglass/experimental.tex	2007/09/21 21:31:25	3228
@@ -135,7 +135,7 @@ profiles from Eq. \ref{eq:laplacetransform} exactly.
 Fig. \ref{fig:images_cooling_plot}. It should be noted that the
 Langevin thermostat produces cooling curves that are consistent with
 Newtonian (single-exponential) cooling, which cannot match the cooling
-profiles from Eq. \ref{eq:laplacetransform} exactly.
+profiles from Eq. \ref{eq:laplacetransform} exactly. Fitting the Langevin cooling profiles to a single-exponential produces $\tau=25.576$ ps, $\tau=43.786$ ps, and $\tau=56.621$ ps for the 20, 30 and 40 {\AA} nanoparticles and a G of $87.5\times 10^{6}$ $(\mathrm{Wm^{-2}K^{-1}})$. The faster cooling G of $117\times 10^{6}$ $(\mathrm{Wm^{-2}K^{-1}})$ produced a $\tau=13.391$ ps, $\tau=30.426$ ps, $\tau=43.857$ ps for the 20, 30 and 40 {\AA} nanoparticles.
 
 \begin{figure}[htbp]
 \centering
