--- trunk/ssdePaper/nptSSD.tex	2004/02/04 22:13:36	1022
+++ trunk/ssdePaper/nptSSD.tex	2004/02/04 22:42:52	1024
@@ -800,7 +800,7 @@ K, shown by SSD and SSD1 respectively.
  were performed at the average densities observed in the 1 atm NPT
  simulations for the respective models. SSD/E is slightly more mobile
  than experiment at all of the temperatures, but it is closer to
- experiment at biologically relavent temperatures than SSD1 without a
+ experiment at biologically relevant temperatures than SSD1 without a
  long-range correction.}
 \label{ssdediffuse} 
 \end{center}
@@ -825,7 +825,7 @@ biologically relavent temperature ranges.  Thus, the c
 the diffusive behavior of the models.  While SSD1 shows more
 experimentally accurate diffusive behavior in the high temperature
 regimes, SSD/E shows more accurate behavior in the supercooled and
-biologically relavent temperature ranges.  Thus, the changes made to
+biologically relevant temperature ranges.  Thus, the changes made to
 improve the liquid structure may have had an adverse affect on the
 density maximum, but they improve the transport behavior of SSD/E
 relative to SSD1 under the most commonly simulated conditions.
