--- trunk/tengDissertation/Lipid.tex	2006/06/07 01:49:15	2807
+++ trunk/tengDissertation/Lipid.tex	2006/06/07 21:03:46	2819
@@ -315,7 +315,7 @@ molecules.}
 \label{lipidFigure:bilayer}
 \end{figure}
 
-\subsubsection{Electron Density Profile (EDP)}
+\subsubsection{\textbf{Electron Density Profile (EDP)}}
 
 Assuming a gaussian distribution of electrons on each atomic center
 with a variance estimated from the size of the van der Waals radius,
@@ -351,7 +351,7 @@ and total density due to DMPC in blue.}
 \label{lipidFigure:electronDensity}
 \end{figure}
 
-\subsubsection{$\text{S}_{\text{{\sc cd}}}$ Order Parameter}
+\subsubsection{\textbf{$\text{S}_{\text{{\sc cd}}}$ Order Parameter}}
 
 Measuring deuterium order parameters by NMR is a useful technique to
 study the orientation of hydrocarbon chains in phospholipids. The
