--- trunk/tengDissertation/LiquidCrystal.tex	2006/07/01 22:27:39	2915
+++ trunk/tengDissertation/LiquidCrystal.tex	2006/07/02 14:21:34	2916
@@ -280,8 +280,8 @@ g(z) =\frac{1}{\pi R^{2} \rho}< \delta (z-z_{ij})>_{ij
 also important to show the density correlation along the director
 which is given by :
 \begin{equation}
-g(z) =\frac{1}{\pi R^{2} \rho}< \delta (z-z_{ij})>_{ij}
-\end{equation},
+g(z) =\frac{1}{\pi R^{2} \rho}< \delta (z-z_{ij})>_{ij},
+\end{equation}
 where $ z_{ij}  = r_{ij}  \cdot \hat Z $ was measured in the
 director frame and $R$ is the radius of the cylindrical sampling
 region. The oscillation in density plot along the director in
