--- trunk/tengDissertation/Methodology.tex	2006/06/07 01:49:15	2807
+++ trunk/tengDissertation/Methodology.tex	2006/06/07 21:03:46	2819
@@ -607,7 +607,7 @@ assume non-orthorhombic geometries.
 
 \subsection{\label{methodSection:otherSpecialEnsembles}Other Special Ensembles}
 
-\subsubsection{\label{methodSection:NPAT}NPAT Ensemble}
+\subsubsection{\label{methodSection:NPAT}\textbf{NPAT Ensemble}}
 
 A comprehensive understanding of structure�Cfunction relations of
 biological membrane system ultimately relies on structure and
@@ -630,7 +630,7 @@ described for the NPTi integrator.
 Note that the iterative schemes for NPAT are identical to those
 described for the NPTi integrator.
 
-\subsubsection{\label{methodSection:NPrT}NP$\gamma$T Ensemble}
+\subsubsection{\label{methodSection:NPrT}\textbf{NP$\gamma$T Ensemble}}
 
 Theoretically, the surface tension $\gamma$ of a stress free
 membrane system should be zero since its surface free energy $G$ is
