--- trunk/xDissertation/md.tex	2008/03/14 21:38:07	3370
+++ trunk/xDissertation/md.tex	2008/03/24 21:32:11	3376
@@ -839,8 +839,8 @@ have recently used axially-specific chromophores
 orientations of the membrane dipoles may be available from
 fluorescence detected linear dichroism (LD).  Benninger {\it et al.}
 have recently used axially-specific chromophores
-2-(4,4-difluoro-5,7-dimethyl-4-bora-3a,4a-diaza-s-indacene-3-pentanoyl)-1-hexadecanoyl-sn-glycero-3-phospocholine
-($\beta$-BODIPY FL C5-HPC or BODIPY-PC) and 3,3'
+2-(4,4-difluoro-5,7-dimethyl-4-bora-3a,4a-diaza-s-indacene-3-pentanoyl)-1-hexadecanoyl-sn-glycero-3-\\
+phospocholine ($\beta$-BODIPY FL C5-HPC or BODIPY-PC) and 3,3'
 dioctadecyloxacarbocyanine perchlorate (DiO) in their
 fluorescence-detected linear dichroism (LD) studies of plasma
 membranes of living cells.\cite{Benninger:2005qy} The DiO dye aligns
